MetSig cut

1 2 3 4 5 6 7 8 9 10

(fb) σ

10 15 20 25 30 35 40 45 50 55 60 -1 CDF Run II Preliminary, 2.6 fb analysis in GMSB TE+γγ

mass=140 GeV, lifetime<<1 ns 1 0χ∼ stat. variation σ expected limit and 1 theoretical production cross section

σ