mass (GeV) 1 0χ∼ 70 80 90 100 110 120 130 140 150

(fb) σ

10

210

310

-1 CDF Run II Preliminary, 2.6 fb in GMSB TE+γγ lifetime<<1 ns 1 0χ∼ stat. variation σ expected limit and 1 observed cross section limit theoretical production cross section

1

σ