β tan

(GeV)

peak ττM

39.2 39.4 39.6 39.8 40 40.2 40.4 40.6 40.8 30 35 40 45 50 55 60

1/2 / m 1/2mδ

0 / m 0mδ

= 210 GeV 0m = 350 GeV

1/2m β tan

0A β tan

(GeV)

(b) peak

effM

-50 -40 -30 -20 -10 0 10 20 30 40 50

1000

1020

1040

1060

0 / m 0mδ 1/2 / m 1/2mδ

0 / m 0mδ

= 210 GeV 0m = 350 GeV

1/2m β tan

0A

(GeV) 0A