X/X δ

(GeV)

peak ττjM

-0.1 -0.05 0 0.05 0.1 320 340 360 380

0 / m 0mδ

0 1χ∼ X = M

Lu~ X = M

(GeV) ττjM

Counts / 50 GeV

0 200 400 600 800 1000 0 20 40 60 = 660 GeV Lu~M

= 840 GeV

Lu~M