(GeV) vis TP 0 20 40 60 80 100

Counts / 10 GeV

210

310 M = 16.9 GeV Δ M = 10.6 GeV Δ M = 5.1 GeV Δ

X/X δ

Slope vis TP

-0.2 -0.1 0 0.1 0.2

-0.12

-0.1

-0.08

-0.06

0 / m 0mδ^0_1χ^∼

X = M_{Lu~} X = M

0 1χ∼ X = M

MΔ X =