(GeV) 0 2χ∼ 200 220 240 260 280 300 320

-1 / 10 fb

OSLS N

100

200

300

400

500

600 M = 10.6 GeV Δ = 140.7 GeV 0 1χ∼M = 831.0 GeV g~M