(GeV) ττjM 0 200 400 600 800 1000 1200 1400

X 50 GeV) -1 Counts / (11 fb

0

10

20

30

40

50

60 OS-LS Counts = 359 0 2χ∼j→q~ q~j→g~ ± 1χ∼j→q~ 0 1χ∼j→q~ ** 0_2χ∼j→q~ Initial Jets, etc

= 149 = 21 = 41 = 29 = 17 = 93