(GeV) ττjM 0 200 400 600 800 1000

X 50 GeV) -1 Counts / (10 fb

0 10 20 30 40 50 60 70 80 M = 10.6 GeV Δ = 140.7 GeV 0 1χ∼M = 260.3 GeV 0 2χ∼M = 660.0 GeV Lu~M

= 840.0 GeV

Lu~M