M (GeV) Δ 6 8 10 12 14 16

(GeV) ττjM

290 300 310 320 330 340 350 360 370 380 390 = 140.7 GeV 0 1χ∼M = 260.3 GeV 0 2χ∼M = 831.0 GeV g~M